diff --git a/apps/canvas/front/src/components/canvas.tsx b/apps/canvas/front/src/components/canvas.tsx
index 2f261f0..8898b58 100644
--- a/apps/canvas/front/src/components/canvas.tsx
+++ b/apps/canvas/front/src/components/canvas.tsx
@@ -47,9 +47,9 @@
             return c.targetHandle === "repository";
         }
         if (sn.type === "app") {
-              if (c.sourceHandle === "ports" && (!sn.data.ports || sn.data.ports.length === 0)) {
+            if (c.sourceHandle === "ports" && (!sn.data.ports || sn.data.ports.length === 0)) {
                 return false;
-              }
+            }
         }
         if (tn.type === "gateway-https") {
             if (c.targetHandle === "https" && tn.data.https !== undefined) {
@@ -81,7 +81,7 @@
                 x: 0,
                 y: 0,
             },
-            isConnectable: true,          
+            isConnectable: true,
             data: {
                 domain: n.domain,
                 label: n.domain,
@@ -109,7 +109,7 @@
                 isValidConnection={isValidConnection}
                 fitView
                 proOptions={{ hideAttribution: true }}
-                >
+            >
                 <Controls />
                 <Background variant={BackgroundVariant.Dots} gap={12} size={1} />
                 <Panel position="bottom-right">
